Sera siporax Professional

Филтер материјал кој може да се користи во слатководни и морски аквариуми и фонтани. Уникатниот материјал од кој што е направен, тридимензионалната структура на порите го прави идеален за населување на позитивна бактерија.

Пакување:

- 35г – за аквариум до 30 литри вода  – цена 200 ден ,

- 500мл – за аквариум до 100 литри вода  – цена  520 ден,

- 1000мл –  за аквариум до 200 литри вода – цена 970 ден,

-